0 1 2 3 4 5 6 7 8 1

1.5

2

2.5 Thcknss vs. inner diam(.95 conf.); o/-.-: controls ( 68), x/--: asthmatics ( 87). F-stat = 2.65, p-value <= 0.050

Inner Diameter (mm)

Wall Thickness (mm)