T=24.00 T=26.00

T=28.00 T=30.00

T=32.00 T=34.00

T=36.00 T=38.00

T=40.00 T=42.00

T=44.00 T=46.00

Vorticity

Data file: 10-FEB-93 om.060

Plot file: 12-Feb-93 14:22:24 om12.plf