T=26.00

T=27.00

T=28.00

T=29.00

T=30.00

T=31.00

T=32.00

T=33.00

T=34.00

T=35.00

T=36.00

T=37.00

Vorticity Field

Data file:

11/15/94 omhp.083.37

Plot file:

23-Nov-94 16:40:19 full12.plf